From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_http_server_release.3http.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_http_server_release.3http.adoc')

diff --git a/docs/man/nng_http_server_release.3http.adoc b/docs/man/nng_http_server_release.3http.adoc
index b17e44af..9f3ab798 100644
--- a/docs/man/nng_http_server_release.3http.adoc
+++ b/docs/man/nng_http_server_release.3http.adoc
@@ -27,7 +27,7 @@ void nng_http_server_release(nng_http_server *server);
 
 The `nng_http_server_release()` releases an instance of an HTTP _server_
 that was previously held with
-<<nng_http_server_hold.3http#,`nng_http_server_hold()`>>.
+`<<nng_http_server_hold.3http#,nng_http_server_hold()>>`.
 
 This effectively drops the reference count on the server instance.  When
 the reference count drops to zero, then the _server_ and all resources
-- 
cgit v1.2.3-70-g09d2

