From dcb962389c5f71bc25cdb84f3363eed95bad9bdd Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 6 Jul 2019 13:33:55 -0700
Subject: fixes #861 Man pages need to use .adoc suffix

---
 docs/man/nng_http_server_release.3http.adoc | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'docs/man/nng_http_server_release.3http.adoc')

diff --git a/docs/man/nng_http_server_release.3http.adoc b/docs/man/nng_http_server_release.3http.adoc
index 62aff752..0d919191 100644
--- a/docs/man/nng_http_server_release.3http.adoc
+++ b/docs/man/nng_http_server_release.3http.adoc
@@ -27,7 +27,7 @@ void nng_http_server_release(nng_http_server *server);
 
 The `nng_http_server_release()` releases an instance of an HTTP _server_
 that was previously held with
-`<<nng_http_server_hold.3http#,nng_http_server_hold()>>`.
+xref:nng_http_server_hold.3http.adoc[`nng_http_server_hold()`].
 
 This effectively drops the reference count on the server instance.  When
 the reference count drops to zero, then the _server_ and all resources
@@ -49,6 +49,6 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng_http_server_hold.3http#,nng_http_server_hold(3http)>>,
-<<nng_http_server_stop.3http#,nng_http_server_stop(3http)>>,
-<<nng.7#,nng(7)>>
+xref:nng_http_server_hold.3http.adoc[nng_http_server_hold(3http)],
+xref:nng_http_server_stop.3http.adoc[nng_http_server_stop(3http)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

