From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/man/nng_http_server_release.adoc | 53 +++++++++++++++++++++++++++++++++++
 1 file changed, 53 insertions(+)
 create mode 100644 docs/man/nng_http_server_release.adoc

(limited to 'docs/man/nng_http_server_release.adoc')

diff --git a/docs/man/nng_http_server_release.adoc b/docs/man/nng_http_server_release.adoc
new file mode 100644
index 00000000..16c28227
--- /dev/null
+++ b/docs/man/nng_http_server_release.adoc
@@ -0,0 +1,53 @@
+= nng_http_server_release(3)
+//
+// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2018 Capitar IT Group BV <info@capitar.com>
+//
+// This document is supplied under the terms of the MIT License, a
+// copy of which should be located in the distribution where this
+// file was obtained (LICENSE.txt).  A copy of the license may also be
+// found online at https://opensource.org/licenses/MIT.
+//
+
+== NAME
+
+nng_http_server_release - release HTTP server instance
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+#include <nng/supplemental/http/http.h>
+
+void nng_http_server_release(nng_http_server *server);
+-----------
+
+== DESCRIPTION
+
+The `nng_http_server_release()` releases an instance of an HTTP _server_
+that was previously held with
+<<nng_http_server_hold#,nng_http_server_hold(3)>>.
+
+This effectively drops the reference count on the server instance.  When
+the reference count drops to zero, then the _server_ and all resources
+associated with it (e.g. HTTP handlers, connections, etc.) are deallocated.
+(If the server is "running" when this occurs, then the server is stopped.)
+
+WARNING: It is an error to release an instance of a server that has
+not previously been held, or to attempt to release an instance more
+times than it has been held.
+
+== RETURN VALUES
+
+None.
+
+== ERRORS
+
+None.
+
+== SEE ALSO
+
+<<nng_http_server_hold#,nng_http_server_hold(3)>>,
+<<nng_http_server_stop#,nng_http_server_stop(3)>>,
+<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

