From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_http_server_set_tls.3http.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_http_server_set_tls.3http.adoc')

diff --git a/docs/man/nng_http_server_set_tls.3http.adoc b/docs/man/nng_http_server_set_tls.3http.adoc
index 2b200653..25d26fa5 100644
--- a/docs/man/nng_http_server_set_tls.3http.adoc
+++ b/docs/man/nng_http_server_set_tls.3http.adoc
@@ -31,14 +31,14 @@ _cfg_.
 This change overwrites any previous TLS configuration.
 
 IMPORTANT: This also invalidates any previously obtained values from
-<<nng_http_server_get_tls.3http#,`nng_http_server_get_tls()`>>.
+`<<nng_http_server_get_tls.3http#,nng_http_server_get_tls()>>`.
 
 If the server is already running (i.e. it has been started with
-<<nng_http_server_start.3http#,`nng_http_server_start()`>>) then this will
+`<<nng_http_server_start.3http#,nng_http_server_start()>>`) then this will
 fail with `NNG_EBUSY`.
 
 TIP: Generally, the _cfg_ must have a configured private key, set with
-<<nng_tls_config_own_cert.3tls#,`nng_tls_config_own_cert()`>> or similar.
+`<<nng_tls_config_own_cert.3tls#,nng_tls_config_own_cert()>>` or similar.
 
 == RETURN VALUES
 
-- 
cgit v1.2.3-70-g09d2

