From 0ddaee41ec753805fa12eeabd679870802528dac Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 29 May 2018 17:03:51 -0700
Subject: fixes #495 SEE ALSO should use [align=left] fixes #494 ERRORS section
 should use [horizontal]

These changes address some basic formatting consistency things,
and ultimately (when combined with other tooling changes that are
not part of this repo) lead to vastly improved layout in the
printed documentation.

While here we removed trailing whitespace, and did certain other
minor markup tweaks.
---
 docs/man/nng_http_server_start.3http.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'docs/man/nng_http_server_start.3http.adoc')

diff --git a/docs/man/nng_http_server_start.3http.adoc b/docs/man/nng_http_server_start.3http.adoc
index 7a631f67..fde77008 100644
--- a/docs/man/nng_http_server_start.3http.adoc
+++ b/docs/man/nng_http_server_start.3http.adoc
@@ -35,6 +35,7 @@ This function returns 0 on success, and non-zero otherwise.
 
 == ERRORS
 
+[horizontal]
 `NNG_EADDRINUSE`:: The TCP port is unavaialble.
 `NNG_EADDRINVAL`:: The server is configured with an invalid address.
 `NNG_ENOMEM`:: Insufficient free memory exists.
@@ -42,6 +43,7 @@ This function returns 0 on success, and non-zero otherwise.
 
 == SEE ALSO
 
+[.text-left]
 <<nng_http_server_hold.3http#,nng_http_server_hold(3http)>>,
 <<nng_http_server_release.3http#,nng_http_server_release(3http)>>,
 <<nng_http_server_stop.3http#,nng_http_server_stop(3http)>>,
-- 
cgit v1.2.3-70-g09d2

