From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_http_server_start.3http.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_http_server_start.3http.adoc')

diff --git a/docs/man/nng_http_server_start.3http.adoc b/docs/man/nng_http_server_start.3http.adoc
index fde77008..c8b7b542 100644
--- a/docs/man/nng_http_server_start.3http.adoc
+++ b/docs/man/nng_http_server_start.3http.adoc
@@ -36,7 +36,7 @@ This function returns 0 on success, and non-zero otherwise.
 == ERRORS
 
 [horizontal]
-`NNG_EADDRINUSE`:: The TCP port is unavaialble.
+`NNG_EADDRINUSE`:: The TCP port is unavailable.
 `NNG_EADDRINVAL`:: The server is configured with an invalid address.
 `NNG_ENOMEM`:: Insufficient free memory exists.
 `NNG_ENOTSUP`:: HTTP not supported.
-- 
cgit v1.2.3-70-g09d2

