From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_ipc.7.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_ipc.7.adoc')

diff --git a/docs/man/nng_ipc.7.adoc b/docs/man/nng_ipc.7.adoc
index 6a7f3972..9b49c87c 100644
--- a/docs/man/nng_ipc.7.adoc
+++ b/docs/man/nng_ipc.7.adoc
@@ -91,7 +91,7 @@ TIP: The best practice for limiting access is to place the socket in a
 directory writable only by the server, and only readable and searchable
 by clients.
 All mainstream POSIX systems will fail to permit a client to connect
-to a socket located in a diretor for which the client lacks search (execute)
+to a socket located in a directory for which the client lacks search (execute)
 permission.
 
 TIP: Also consider using the `NNG_OPT_IPC_PEER_UID` property from within a
-- 
cgit v1.2.3-70-g09d2

