From 0ddaee41ec753805fa12eeabd679870802528dac Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 29 May 2018 17:03:51 -0700
Subject: fixes #495 SEE ALSO should use [align=left] fixes #494 ERRORS section
 should use [horizontal]

These changes address some basic formatting consistency things,
and ultimately (when combined with other tooling changes that are
not part of this repo) lead to vastly improved layout in the
printed documentation.

While here we removed trailing whitespace, and did certain other
minor markup tweaks.
---
 docs/man/nng_msg_dup.3.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'docs/man/nng_msg_dup.3.adoc')

diff --git a/docs/man/nng_msg_dup.3.adoc b/docs/man/nng_msg_dup.3.adoc
index 2018f9c7..22ca4875 100644
--- a/docs/man/nng_msg_dup.3.adoc
+++ b/docs/man/nng_msg_dup.3.adoc
@@ -36,10 +36,12 @@ This function returns 0 on success, and non-zero otherwise.
 
 == ERRORS
 
+[horizontal]
 `NNG_ENOMEM`:: Insufficient free memory exists to duplicate a message.
 
 == SEE ALSO
 
+[.text-left]
 <<nng_msg_alloc.3#,nng_msg_alloc(3)>>,
 <<nng_msg_free.3#,nng_msg_free(3)>>,
 <<nng_strerror.3#,nng_strerror(3)>>,
-- 
cgit v1.2.3-70-g09d2

