From 60bf092d3e6e68d0af55c78b679310b1687016e8 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 16 Apr 2022 14:36:27 -0700
Subject: fixes #1577 nng_stat_find_socket always returns the same stats node

Also this fixes problems with uninitialized socket names, and the
socket name stat not being adjusted correctly when set via API.
---
 docs/man/nng_options.5.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_options.5.adoc')

diff --git a/docs/man/nng_options.5.adoc b/docs/man/nng_options.5.adoc
index 1ad61c46..e4e5124d 100644
--- a/docs/man/nng_options.5.adoc
+++ b/docs/man/nng_options.5.adoc
@@ -282,7 +282,7 @@ return value of `NNG_ETIMEDOUT`.
 (((name, socket)))
 (string)
 This the socket name.
-By default this is a string corresponding to the value of the socket.
+By default, this is a string corresponding to the value of the socket.
 The string must fit within 64-bytes, including the terminating
 `NUL` byte.
 The value is intended for application use, and is not used for anything
-- 
cgit v1.2.3-70-g09d2

