From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_pair.7.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_pair.7.adoc')

diff --git a/docs/man/nng_pair.7.adoc b/docs/man/nng_pair.7.adoc
index 62075753..9a035823 100644
--- a/docs/man/nng_pair.7.adoc
+++ b/docs/man/nng_pair.7.adoc
@@ -40,7 +40,7 @@ The xref:nng_pair_open.3.adoc[`nng_pair_open()`] functions create a _pair_ socke
 Normally, this pattern will block when attempting to send a message if
 no peer is able to receive the message.
 
-NOTE: Even though this mode may appear to be "`reliable`", because back-pressure
+NOTE: Even though this mode may appear to be reliable, because back-pressure
 prevents discarding messages most of the time, there are topologies involving
 _devices_ (see xref:nng_device.3.adoc[`nng_device()`]) or raw mode sockets
 (see xref:nng_options.5.adoc#NNG_OPT_RAW[`NNG_OPT_RAW`]) where
-- 
cgit v1.2.3-70-g09d2

