From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_pipe_socket.3.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_pipe_socket.3.adoc')

diff --git a/docs/man/nng_pipe_socket.3.adoc b/docs/man/nng_pipe_socket.3.adoc
index e5da1d55..755ed776 100644
--- a/docs/man/nng_pipe_socket.3.adoc
+++ b/docs/man/nng_pipe_socket.3.adoc
@@ -25,14 +25,14 @@ nng_socket nng_pipe_socket(nng_pipe p);
 == DESCRIPTION
 
 The `nng_pipe_socket()` function returns the xref:nng_socket.5.adoc[`nng_socket`]
-that owns the pipe _p_.
+associated with the pipe _p_.
 
 NOTE: The returned socket may be closed or in the process of closing, in
 which case it will not be usable with other functions.
 
 == RETURN VALUES
 
-This function returns the socket that "`owns`" the pipe.
+This function returns the socket associated with the pipe.
 
 == ERRORS
 
-- 
cgit v1.2.3-70-g09d2

