From dcb962389c5f71bc25cdb84f3363eed95bad9bdd Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 6 Jul 2019 13:33:55 -0700
Subject: fixes #861 Man pages need to use .adoc suffix

---
 docs/man/nng_pipe_socket.3.adoc | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'docs/man/nng_pipe_socket.3.adoc')

diff --git a/docs/man/nng_pipe_socket.3.adoc b/docs/man/nng_pipe_socket.3.adoc
index ec523718..e5da1d55 100644
--- a/docs/man/nng_pipe_socket.3.adoc
+++ b/docs/man/nng_pipe_socket.3.adoc
@@ -24,7 +24,7 @@ nng_socket nng_pipe_socket(nng_pipe p);
 
 == DESCRIPTION
 
-The `nng_pipe_socket()` function returns the `<<nng_socket.5#,nng_socket>>`
+The `nng_pipe_socket()` function returns the xref:nng_socket.5.adoc[`nng_socket`]
 that owns the pipe _p_.
 
 NOTE: The returned socket may be closed or in the process of closing, in
@@ -41,6 +41,6 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng_pipe.5#,nng_pipe(5)>>,
-<<nng_socket.5#,nng_socket(5)>>,
-<<nng.7#,nng(7)>>
+xref:nng_pipe.5.adoc[nng_pipe(5)],
+xref:nng_socket.5.adoc[nng_socket(5)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

