From dcb962389c5f71bc25cdb84f3363eed95bad9bdd Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 6 Jul 2019 13:33:55 -0700
Subject: fixes #861 Man pages need to use .adoc suffix

---
 docs/man/nng_random.3supp.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_random.3supp.adoc')

diff --git a/docs/man/nng_random.3supp.adoc b/docs/man/nng_random.3supp.adoc
index 424ad32b..3f8ac39e 100644
--- a/docs/man/nng_random.3supp.adoc
+++ b/docs/man/nng_random.3supp.adoc
@@ -42,4 +42,4 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng.7#,nng(7)>>
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

