From 91f9061ad9289afffb0111c03a8390d0f82d7114 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 25 Jun 2018 17:26:56 -0700
Subject: fixes #552 man pages do not document NNG_ETIMEDOUT

---
 docs/man/nng_send.3.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'docs/man/nng_send.3.adoc')

diff --git a/docs/man/nng_send.3.adoc b/docs/man/nng_send.3.adoc
index 03367893..ef31cbbe 100644
--- a/docs/man/nng_send.3.adoc
+++ b/docs/man/nng_send.3.adoc
@@ -79,13 +79,14 @@ This function returns 0 on success, and non-zero otherwise.
 == ERRORS
 
 [horizontal]
-`NNG_EAGAIN`:: The socket _s_ cannot accept data for sending.
+`NNG_EAGAIN`:: The operation would block, but `NNG_FLAG_NONBLOCK` was specified.
 `NNG_ECLOSED`:: The socket _s_ is not open.
 `NNG_EINVAL`:: An invalid set of _flags_ was specified.
 `NNG_EMSGSIZE`:: The value of _size_ is too large.
 `NNG_ENOMEM`:: Insufficient memory is available.
 `NNG_ENOTSUP`:: The protocol for socket _s_ does not support sending.
 `NNG_ESTATE`:: The socket _s_ cannot send data in this state.
+`NNG_ETIMEDOUT`:: The operation timed out.
 
 == SEE ALSO
 
-- 
cgit v1.2.3-70-g09d2

