From 8b979454d891b84da727a329906c4293fadc5f3c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 18 Mar 2018 12:46:31 -0700
Subject: fixes #295 boolean options should use C99 bool type fixes #275
 nng_pipe_getopt_ptr() missing? fixes #285 nng_setopt_ptr MIS fixes #297
 nng_listener/dialer_close does not validate mode

This change adds some missing APIs, and changes others.
In particular, certain options are now of type bool, with size
of just one.  This is a *breaking* change for code that uses those
options -- NNG_OPT_RAW, NNG_OPT_PAIR1_POLY, NNG_OPT_TLS_VERIFIED.
---
 docs/man/nng_setopt.3.adoc | 9 +++++++--
 1 file changed, 7 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_setopt.3.adoc')

diff --git a/docs/man/nng_setopt.3.adoc b/docs/man/nng_setopt.3.adoc
index 95284852..201181cc 100644
--- a/docs/man/nng_setopt.3.adoc
+++ b/docs/man/nng_setopt.3.adoc
@@ -21,6 +21,8 @@ nng_setopt - set socket option
 
 int nng_setopt(nng_socket s, const char *opt, const void *val, size_t valsz);
 
+int nng_setopt_bool(nng_socket s, const char *opt, int bval);
+
 int nng_setopt_int(nng_socket s, const char *opt, int ival);
 
 int nng_setopt_ms(nng_socket s, const char *opt, nng_duration dur);
@@ -59,10 +61,13 @@ This function is untyped, and can be used to configure any arbitrary data.
 The _val_ pointer addresses the data to copy, and _valsz_ is the
 size of the objected located at _val_.
 
+`nng_setopt_bool()`::
+This function is for options which take a boolean (`bool`).
+The _bval_ is passed to the option.
+
 `nng_setopt_int()`::
-This function is for options which take an integer (`int`) or boolean (`bool`).
+This function is for options which take an integer (`int`).
 The _ival_ is passed to the option.
-For booleans pass either 0 (`false`) or 1 (`true`).
 
 `nng_setopt_ms()`::
 This function is used to configure time durations (such as timeouts) using
-- 
cgit v1.2.3-70-g09d2

