From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_sleep_aio.3.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_sleep_aio.3.adoc')

diff --git a/docs/man/nng_sleep_aio.3.adoc b/docs/man/nng_sleep_aio.3.adoc
index 323e6039..2a3cf4f2 100644
--- a/docs/man/nng_sleep_aio.3.adoc
+++ b/docs/man/nng_sleep_aio.3.adoc
@@ -1,6 +1,6 @@
 = nng_sleep_aio(3)
 //
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
 // Copyright 2018 Capitar IT Group BV <info@capitar.com>
 //
 // This document is supplied under the terms of the MIT License, a
@@ -24,7 +24,7 @@ void nng_sleep_aio(nng_duration msec, nng_aio *aio);
 
 == DESCRIPTION
 
-The `nng_sleep_aio()` function performs an asynchronous "`sleep`",
+The `nng_sleep_aio()` function provides an asynchronous delay mechanism,
 causing the callback for _aio_ to be executed after _msec_ milliseconds.
 If the sleep finishes completely, the result will always be zero.
 
-- 
cgit v1.2.3-70-g09d2

