From dcb962389c5f71bc25cdb84f3363eed95bad9bdd Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 6 Jul 2019 13:33:55 -0700
Subject: fixes #861 Man pages need to use .adoc suffix

---
 docs/man/nng_socket_get.3.adoc | 32 ++++++++++++++++----------------
 1 file changed, 16 insertions(+), 16 deletions(-)

(limited to 'docs/man/nng_socket_get.3.adoc')

diff --git a/docs/man/nng_socket_get.3.adoc b/docs/man/nng_socket_get.3.adoc
index d077207d..6c2ec87e 100644
--- a/docs/man/nng_socket_get.3.adoc
+++ b/docs/man/nng_socket_get.3.adoc
@@ -43,9 +43,9 @@ int nng_socket_get_addr(nng_socket s, const char *opt, nng_sockaddr *addrp);
 
 (((options, socket)))
 The `nng_socket_get()` functions are used to retrieve option values for
-the <<nng_socket.5#,socket>> _s_.
+the xref:nng_socket.5.adoc[socket] _s_.
 The actual options that may be retrieved in this way vary.
-A number of them are documented in <<nng_options.5#,nng_options(5)>>.
+A number of them are documented in xref:nng_options.5.adoc[nng_options(5)].
 
 Additionally transport-specific options and protocol-specific options are
 documented with the transports and protocols themselves.
@@ -87,7 +87,7 @@ This function is for options which take an integer (`int`).
 The value will be stored at _ivalp_.
 
 `nng_socket_get_ms()`::
-This function is used to retrieve time <<nng_duration.5#,durations>>
+This function is used to retrieve time xref:nng_duration.5.adoc[durations]
 (such as timeouts), stored in _durp_ as a number of milliseconds.
 (The special value ((`NNG_DUR_INFINITE`)) means an infinite amount of time, and
 the special value ((`NNG_DUR_DEFAULT`)) means a context-specific default.)
@@ -104,9 +104,9 @@ typically for buffer sizes, message maximum sizes, and similar options.
 
 `nng_socket_get_string()`::
 This function is used to retrieve a string into _strp_.
-This string is created from the source using `<<nng_strdup.3#,nng_strdup()>>`
+This string is created from the source using xref:nng_strdup.3.adoc[`nng_strdup()`]
 and consequently must be freed by the caller using
-`<<nng_strfree.3#,nng_strfree()>>` when it is no longer needed.
+xref:nng_strfree.3.adoc[`nng_strfree()`] when it is no longer needed.
 
 `nng_socket_get_uint64()`::
 This function is used to retrieve a 64-bit unsigned value into the value
@@ -131,14 +131,14 @@ These functions return 0 on success, and non-zero otherwise.
 == SEE ALSO
 
 [.text-left]
-<<nng_dialer_get.3#,nng_dialer_get(3)>>,
-<<nng_listener_get.3#,nng_listener_get(3)>>,
-<<nng_pipe_get.3#,nng_pipe_get(3)>>,
-<<nng_socket_set.3#,nng_socket_set(3)>>,
-<<nng_strdup.3#,nng_strdup(3)>>,
-<<nng_strerror.3#,nng_strerror(3)>>,
-<<nng_strfree.3#,nng_strfree(3)>>,
-<<nng_duration.5#,nng_duration(5)>>,
-<<nng_options.5#,nng_options(5)>>,
-<<nng_socket.5#,nng_socket(5)>>,
-<<nng.7#,nng(7)>>
+xref:nng_dialer_get.3.adoc[nng_dialer_get(3)],
+xref:nng_listener_get.3.adoc[nng_listener_get(3)],
+xref:nng_pipe_get.3.adoc[nng_pipe_get(3)],
+xref:nng_socket_set.3.adoc[nng_socket_set(3)],
+xref:nng_strdup.3.adoc[nng_strdup(3)],
+xref:nng_strerror.3.adoc[nng_strerror(3)],
+xref:nng_strfree.3.adoc[nng_strfree(3)],
+xref:nng_duration.5.adoc[nng_duration(5)],
+xref:nng_options.5.adoc[nng_options(5)],
+xref:nng_socket.5.adoc[nng_socket(5)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

