From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_socket_id.3.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_socket_id.3.adoc')

diff --git a/docs/man/nng_socket_id.3.adoc b/docs/man/nng_socket_id.3.adoc
index b5acc98b..e9379a6b 100644
--- a/docs/man/nng_socket_id.3.adoc
+++ b/docs/man/nng_socket_id.3.adoc
@@ -29,10 +29,10 @@ if it is valid.
 Otherwise it returns `-1`.
 
 NOTE: A socket is considered valid if it was ever opened with a protocol
-constructor, such as the <<nng_req0_open.3#,`nng_req0_open`>> function.
+constructor, such as the `<<nng_req0_open.3#,nng_req0_open()>>` function.
 Sockets that are allocated on the stack or statically should be
 initialized with the macro
-<<nng_socket.5#NNG_SOCKET_INITIALIZER,`NNG_SOCKET_INITIALIZER`>> to ensure that
+`<<nng_socket.5#NNG_SOCKET_INITIALIZER,NNG_SOCKET_INITIALIZER>>` to ensure that
 they cannot be confused with a valid socket before they are opened.
 
 == RETURN VALUES
-- 
cgit v1.2.3-70-g09d2

