From 80c30307f446eab04e0f809c5b29a61d19a46961 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 27 Nov 2018 16:58:44 -0800
Subject: fixes #805 Bad cross reference in nng_stat_value page

---
 docs/man/nng_stat_value.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_stat_value.3.adoc')

diff --git a/docs/man/nng_stat_value.3.adoc b/docs/man/nng_stat_value.3.adoc
index 2864ba30..320e2f01 100644
--- a/docs/man/nng_stat_value.3.adoc
+++ b/docs/man/nng_stat_value.3.adoc
@@ -30,7 +30,7 @@ The `nng_stat_value()` function returns a numeric value for the statistic _stat_
 If the statistic has a boolean value, then zero is returned for `false`, and
 one is returned for `true`.
 Otherwise, if the string is not of numeric type, then zero is returned.
-See `<<nng_stat_type.3#,nng_stat_type(3)>>` for a description of statistic types.
+See `<<nng_stat_type.3#,nng_stat_type()>>` for a description of statistic types.
 
 == RETURN VALUES
 
-- 
cgit v1.2.3-70-g09d2

