From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_stream.5.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_stream.5.adoc')

diff --git a/docs/man/nng_stream.5.adoc b/docs/man/nng_stream.5.adoc
index 7d426a92..9144deb5 100644
--- a/docs/man/nng_stream.5.adoc
+++ b/docs/man/nng_stream.5.adoc
@@ -41,7 +41,7 @@ xref:nng_stream_dialer_dial.3str.adoc[`nng_stream_dialer_dial()`]
 or by accepting in incoming connection with
 xref:nng_stream_listener_accept.3str.adoc[`nng_stream_listener_accept()`].
 
-Byte streams are "`reliable`" in that data
+Byte streams are reliable in that data
 will not be delivered out of order, or with portions missing.
 
 Data can be sent using
-- 
cgit v1.2.3-70-g09d2

