From c166b153c20ac081f41d53e3258f0bca04356981 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 25 May 2020 18:16:30 -0700
Subject: Yet more cross reference fixes

---
 docs/man/nng_stream_dialer_dial.3str.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_stream_dialer_dial.3str.adoc')

diff --git a/docs/man/nng_stream_dialer_dial.3str.adoc b/docs/man/nng_stream_dialer_dial.3str.adoc
index cc4c55de..8dcd4ec2 100644
--- a/docs/man/nng_stream_dialer_dial.3str.adoc
+++ b/docs/man/nng_stream_dialer_dial.3str.adoc
@@ -1,6 +1,6 @@
 = nng_stream_dialer_dial(3str)
 //
-// Copyright 2019 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
 // Copyright 2018 Capitar IT Group BV <info@capitar.com>
 // Copyright 2019 Devolutions <info@devolutions.net>
 //
@@ -31,7 +31,7 @@ The operation is completed asynchronously, using _aio_.
 
 TIP: The peer address is determined by the address specified using
 xref:nng_stream_dialer_alloc.3str.adoc[`nng_stream_dialer_alloc()`] or 
-xref:nng_stream_dialer_alloc_url.3str.adoc[`nng_stream_dialer_alloc_url()`]. 
+xref:nng_stream_dialer_alloc.3str.adoc[`nng_stream_dialer_alloc_url()`].
 
 If a connection is successfully established, the _aio_ will have the
 resulting
-- 
cgit v1.2.3-70-g09d2

