From b26fc00bd1a8e83aabf7a6c1735d911b9d253d84 Mon Sep 17 00:00:00 2001
From: jake-ruyi <38336907+jake-ruyi@users.noreply.github.com>
Date: Wed, 20 Feb 2019 20:38:04 -0700
Subject: Fixes manpage typos (#886)

---
 docs/man/nng_stream_dialer_set.3str.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_stream_dialer_set.3str.adoc')

diff --git a/docs/man/nng_stream_dialer_set.3str.adoc b/docs/man/nng_stream_dialer_set.3str.adoc
index 1a1b6862..7afc83b5 100644
--- a/docs/man/nng_stream_dialer_set.3str.adoc
+++ b/docs/man/nng_stream_dialer_set.3str.adoc
@@ -22,7 +22,7 @@ nng_stream_dialer_set - set option on byte stream dialer
 
 int nng_stream_dialer_set(nng_stream_dialer *d, const char *name, const void *data, size_t size);
 
-int nng_stream_dialer_set_bool(nng_stream_dialer *d, const char *opt, int val);
+int nng_stream_dialer_set_bool(nng_stream_dialer *d, const char *opt, bool val);
 
 int nng_stream_dialer_set_int(nng_stream_dialer *d, const char *opt, int val);
 
-- 
cgit v1.2.3-70-g09d2

