From f73cd76f54b8aead38689e0ea805d5d805dfbe96 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 30 Mar 2024 23:07:20 -0700
Subject: Staging work. converted nng_ipc.

---
 docs/man/nng_stream_dialer_set.3str.adoc | 133 -------------------------------
 1 file changed, 133 deletions(-)
 delete mode 100644 docs/man/nng_stream_dialer_set.3str.adoc

(limited to 'docs/man/nng_stream_dialer_set.3str.adoc')

diff --git a/docs/man/nng_stream_dialer_set.3str.adoc b/docs/man/nng_stream_dialer_set.3str.adoc
deleted file mode 100644
index bd4ac478..00000000
--- a/docs/man/nng_stream_dialer_set.3str.adoc
+++ /dev/null
@@ -1,133 +0,0 @@
-= nng_stream_dialer_set(3str)
-//
-// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-// Copyright 2019 Devolutions <info@devolutions.net>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_stream_dialer_set - set option on byte stream dialer
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nng/nng.h>
-
-int nng_stream_dialer_set(nng_stream_dialer *d, const char *name, const void *data, size_t size);
-
-int nng_stream_dialer_set_bool(nng_stream_dialer *d, const char *opt, bool val);
-
-int nng_stream_dialer_set_int(nng_stream_dialer *d, const char *opt, int val);
-
-int nng_stream_dialer_set_ms(nng_stream_dialer *d, const char *opt, nng_duration val);
-
-int nng_stream_dialer_set_ptr(nng_stream_dialer *d, const char *opt, void *val);
-
-int nng_stream_dialer_set_size(nng_stream_dialer *d, const char *opt, size_t val);
-
-int nng_stream_dialer_set_string(nng_stream_dialer *d, const char *opt, const char *val);
-
-int nng_stream_dialer_set_uint64(nng_stream_dialer *d, const char *opt, uint64_t val);
-
-int nng_stream_dialer_set_addr(nng_stream_dialer *d, const char *opt, const nng_sockaddr *val);
-
-----
-
-== DESCRIPTION
-
-The `nng_stream_dialer_set()` functions are used to configure options for the
-xref:nng_stream.5.adoc[byte stream dialer] _d_.
-The actual options that may be configured in this way vary, and are
-specified by _opt_.
-A number of them are documented in
-xref:nng_options.5.adoc[nng_options(5)].
-
-Additionally some transport-specific and protocol-specific options are
-documented with the transports and protocols themselves.
-
-=== Forms
-
-The details of the type, size, and semantics of the option will depend
-on the actual option, and will be documented with the option itself.
-
-`nng_stream_dialer_set()`::
-This function is untyped, and can be used to configure any arbitrary data.
-The _val_ pointer addresses the data to copy, and _size_ is the
-size of the objected located at _val_.
-+
-TIP: It may be easier to use one of the typed forms of this function.
-
-`nng_stream_dialer_set_bool()`::
-This function is for options which take a Boolean (`bool`).
-
-`nng_stream_dialer_set_int()`::
-This function is for options which take an integer (`int`).
-
-`nng_stream_dialer_set_ms()`::
-This function is used to configure time durations (such as timeouts) using
-the type
-xref:nng_duration.5.adoc[`nng_duration`].
-The duration is an integer number of milliseconds.
-
-`nng_stream_dialer_set_ptr()`::
-This function is used to pass a pointer to structured data.
-The data referenced by is generally managed by other functions.
-For example, TLS configuration objects created with
-xref:nng_tls_config_alloc.3tls.adoc[`nng_tls_config_alloc()`]
-can be passed this way.
-+
-NOTE: This form is somewhat special in that the object is generally
-not copied, but instead the *pointer* to the object is copied.
-Please see the documentation for the specific option for further details.
-
-`nng_stream_dialer_set_size()`::
-This function is used to configure a size, typically for buffer sizes,
-message maximum sizes, and similar options.
-
-`nng_stream_dialer_set_string()`::
-This function is used to pass configure a string.
-Strings passed this way must be legal UTF-8 or ASCII strings, terminated
-with a `NUL` (`\0`) byte.
-(Other constraints may apply as well, see the documentation for each option
-for details.)
-
-`nng_stream_dialer_set_uint64()`::
-This function is used to configure a 64-bit unsigned value/
-This is typically used for identifiers, network numbers,
-and similar options.
-
-`nng_stream_dialer_set_addr()`::
-This function is used to configure a
-xref:nng_sockaddr.5.adoc[socket address].
-The value is copied, and thus the caller may discard the supplied
-value immediately after this function returns.
-
-== RETURN VALUES
-
-This function returns 0 on success, and non-zero otherwise.
-
-== ERRORS
-
-[horizontal]
-`NNG_ECLOSED`:: The dialer is closed.
-`NNG_EINVAL`:: Either _data_ or _size_ are invalid.
-`NNG_ENOTSUP`:: The option is not supported.
-`NNG_EREADONLY`:: The option may not be modified.
-
-== SEE ALSO
-
-[.text-left]
-xref:nng_strerror.3.adoc[nng_strerror(3)],
-xref:nng_stream_dialer_get.3str.adoc[nng_stream_dialer_get(3str)],
-xref:nng_options.5.adoc[nng_options(5)],
-xref:nng_ipc_options.5.adoc[nng_ipc_options(5)],
-xref:nng_tcp_options.5.adoc[nng_tcp_options(5)],
-xref:nng_tls_options.5.adoc[nng_tls_options(5)],
-xref:nng_stream_dialer.5.adoc[nng_stream_dialer(5)]
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

