From e618abf8f3db2a94269a79c8901a51148d48fcc2 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 9 Aug 2019 19:29:51 -0700
Subject: fixes #970 TCP connections through docker-proxy do not reconnect

---
 docs/man/nng_stream_recv.3str.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'docs/man/nng_stream_recv.3str.adoc')

diff --git a/docs/man/nng_stream_recv.3str.adoc b/docs/man/nng_stream_recv.3str.adoc
index 6b5e5b37..148be978 100644
--- a/docs/man/nng_stream_recv.3str.adoc
+++ b/docs/man/nng_stream_recv.3str.adoc
@@ -56,6 +56,7 @@ None.
 `NNG_ECANCELED`:: The operation was canceled.
 `NNG_ECLOSED`:: The connection was closed.
 `NNG_ECONNRESET`:: The peer closed the connection.
+`NNG_ECONNSHUT`:: Remote peer shutdown after sending data.
 `NNG_EINVAL`:: The _aio_ does not contain a valid scatter/gather vector.
 `NNG_ENOMEM`:: Insufficient free memory to perform the operation.
 `NNG_ETIMEDOUT`:: Timeout waiting for data from the connection.
-- 
cgit v1.2.3-70-g09d2

