From f73cd76f54b8aead38689e0ea805d5d805dfbe96 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 30 Mar 2024 23:07:20 -0700
Subject: Staging work. converted nng_ipc.

---
 docs/man/nng_stream_send.3str.adoc | 74 --------------------------------------
 1 file changed, 74 deletions(-)
 delete mode 100644 docs/man/nng_stream_send.3str.adoc

(limited to 'docs/man/nng_stream_send.3str.adoc')

diff --git a/docs/man/nng_stream_send.3str.adoc b/docs/man/nng_stream_send.3str.adoc
deleted file mode 100644
index 5a53e63c..00000000
--- a/docs/man/nng_stream_send.3str.adoc
+++ /dev/null
@@ -1,74 +0,0 @@
-= nng_stream_send(3str)
-//
-// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-// Copyright 2019 Devolutions <info@devolutions.net>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_stream_send - send to byte stream
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nng/nng.h>
-
-void nng_stream_send(nng_stream *s, nng_aio *aio);
-----
-
-== DESCRIPTION
-
-The `nng_stream_send()` function starts an asynchronous send over the
-xref:nng_stream.5.adoc[byte stream] _s_
-from the scatter/gather vector located in the
-asynchronous I/O structure _aio_.
-
-NOTE: The
-xref:nng_aio_set_iov.3.adoc[`nng_aio_set_iov()`]
-function must have been
-called first, to set the scatter/gather vector for _aio_.
-
-This function returns immediately, with no return value.
-Completion of the operation is signaled via the _aio_, and the final
-result may be obtained via
-xref:nng_aio_result.3.adoc[`nng_aio_result()`].
-That result will either be zero or an error code.
-
-The I/O operation completes as soon as at least one byte has been
-sent, or an error has occurred.
-Therefore, the number of bytes sent may be less than requested.
-The actual number of bytes sent can be determined with
-xref:nng_aio_count.3.adoc[`nng_aio_count()`].
-
-== RETURN VALUES
-
-None.
-
-== ERRORS
-
-[horizontal]
-`NNG_ECANCELED`:: The operation was canceled.
-`NNG_ECLOSED`:: The connection was closed.
-`NNG_ECONNRESET`:: The peer closed the connection.
-`NNG_EINVAL`:: The _aio_ does not contain a valid scatter/gather vector.
-`NNG_ENOMEM`:: Insufficient free memory to perform the operation.
-`NNG_ETIMEDOUT`:: Timeout waiting for data from the connection.
-
-== SEE ALSO
-
-[.text-left]
-xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
-xref:nng_aio_count.3.adoc[nng_aio_count(3)],
-xref:nng_aio_result.3.adoc[nng_aio_result(3)],
-xref:nng_aio_set_iov.3.adoc[nng_aio_set_iov(3)],
-xref:nng_strerror.3.adoc[nng_strerror(3)],
-xref:nng_stream_close.3str.adoc[nng_stream_close(3str)],
-xref:nng_stream_recv.3str.adoc[nng_stream_recv(3str)],
-xref:nng_stream.5.adoc[nng_stream(5)]
-- 
cgit v1.2.3-70-g09d2

