From 0172c0512a1d8bb3e165b76d9dd65925965bd3f8 Mon Sep 17 00:00:00 2001
From: Paulo Henrique Silva <ph.silva@gmail.com>
Date: Wed, 23 Aug 2023 17:05:02 -0300
Subject: fix typo in nng_thread_set_name doc

function name was wrong in the code snippet.
---
 docs/man/nng_thread_set_name.3supp.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_thread_set_name.3supp.adoc')

diff --git a/docs/man/nng_thread_set_name.3supp.adoc b/docs/man/nng_thread_set_name.3supp.adoc
index 385d2727..36dd8267 100644
--- a/docs/man/nng_thread_set_name.3supp.adoc
+++ b/docs/man/nng_thread_set_name.3supp.adoc
@@ -19,7 +19,7 @@ nng_thread_set_name - set thread name
 #include <nng/nng.h>
 #include <nng/supplemental/util/platform.h>
 
-void nng_set_thread_name(nng_thread *thread, const char *name);
+void nng_thread_set_name(nng_thread *thread, const char *name);
 ----
 
 == DESCRIPTION
-- 
cgit v1.2.3-70-g09d2

