From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_tls.7.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_tls.7.adoc')

diff --git a/docs/man/nng_tls.7.adoc b/docs/man/nng_tls.7.adoc
index 78a87b86..61d0b220 100644
--- a/docs/man/nng_tls.7.adoc
+++ b/docs/man/nng_tls.7.adoc
@@ -174,7 +174,7 @@ more details.
 
 ((`NNG_OPT_TLS_VERIFIED`))::
 
-This is a read-only option which returns a boolean value (integer 0 or 1).
+This is a read-only option which returns a Boolean value (integer 0 or 1).
 It will true (1) if the remote peer has been properly verified using TLS
 authentication, or false (0) otherwise.
 This option may return incorrect
-- 
cgit v1.2.3-70-g09d2

