From 5cf750697624d4fd63cfe26921209d7c30e1a2d2 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 21 Jan 2019 22:40:10 -0800
Subject: fixes #872 create unified nng_stream API

This is a major change, and includes changes to use a polymorphic
stream API for all transports.  There have been related bugs fixed
along the way.  Additionally the man pages have changed.

The old non-polymorphic APIs are removed now.  This is a breaking
change, but the old APIs were never part of any released public API.
---
 docs/man/nng_tls_dialer_alloc.3tls.adoc | 52 ---------------------------------
 1 file changed, 52 deletions(-)
 delete mode 100644 docs/man/nng_tls_dialer_alloc.3tls.adoc

(limited to 'docs/man/nng_tls_dialer_alloc.3tls.adoc')

diff --git a/docs/man/nng_tls_dialer_alloc.3tls.adoc b/docs/man/nng_tls_dialer_alloc.3tls.adoc
deleted file mode 100644
index 6a59eaee..00000000
--- a/docs/man/nng_tls_dialer_alloc.3tls.adoc
+++ /dev/null
@@ -1,52 +0,0 @@
-= nng_tls_dialer_alloc(3tls)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-// Copyright 2019 Devolutions <info@devolutions.net>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_tls_dialer_alloc - allocate TLS dialer
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nng/nng.h>
-#include <nng/supplemental/tls/tls.h>
-
-int nng_tls_dialer_alloc(nng_tls_dialer *dp);
-----
-
-== DESCRIPTION
-
-The `nng_tls_dialer_alloc()` allocates a TLS dialer, which can be used
-to create outgoing connections over TLS, and stores a pointer to it
-it in the location referenced by _dp_.
-
-== RETURN VALUES
-
-This function returns 0 on success, and non-zero otherwise.
-
-== ERRORS
-
-[horizontal]
-`NNG_ENOMEM`:: Insufficient free memory exists.
-`NNG_ENOTSUP`:: TLS support not configured in library.
-
-== SEE ALSO
-
-[.text-left]
-<<nng_strerror.3#,nng_strerror(3)>>,
-<<nng_tls_dialer_close.3tls#,nng_tls_dialer_close(3tls)>>,
-<<nng_tls_dialer_dial.3tls#,nng_tls_dialer_dial(3tls)>>,
-<<nng_tls_dialer_free.3tls#,nng_tls_dialer_free(3tls)>>,
-<<nng_tls_dialer_getopt.3tls#,nng_tls_dialer_getopt(3tls)>>,
-<<nng_tls_dialer_setopt.3tls#,nng_tls_dialer_setopt(3tls)>>,
-<<nng_tls_dialer.5#,nng_tls_dialer(5)>>
-- 
cgit v1.2.3-70-g09d2

