From f4de6b5302df8befbd2b229b701d0bf9ca81a5fb Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 14 Mar 2018 15:19:26 -0700
Subject: Markup changes, started adding type documentation.

---
 docs/man/nng_version.adoc | 19 ++++++++++---------
 1 file changed, 10 insertions(+), 9 deletions(-)

(limited to 'docs/man/nng_version.adoc')

diff --git a/docs/man/nng_version.adoc b/docs/man/nng_version.adoc
index 3f69b0ca..bc578682 100644
--- a/docs/man/nng_version.adoc
+++ b/docs/man/nng_version.adoc
@@ -24,27 +24,28 @@ const char * nng_version(void);
 
 == DESCRIPTION
 
-The `nng_version()` function returns a human readable version
-number for the _nng_ library.  This is intended for output in
-programs, and so forth.
+The ((`nng_version()`)) function returns a human readable ((version number))
+for the _nng_ library.
+This is intended for output in programs, and so forth.
 
 Additionally, compile time version information is available
 via some predefined macros:
 
-`NNG_MAJOR_VERSION`:: Major version number.
-`NNG_MINOR_VERSION`:: Minor version number.
-`NNG_PATCH_VERSION`:: Patch version number.
+((`NNG_MAJOR_VERSION`)):: Major version number.
+((`NNG_MINOR_VERSION`)):: Minor version number.
+((`NNG_PATCH_VERSION`)):: Patch version number.
 
 The _nng_ library is developed and released using
-http:///www.semver.org[Semantic Versioning 2.0], and
+http://www.semver.org[Semantic Versioning 2.0], and
 the version numbers reported refer to both the API and the
-library itself.  (The ABI -- binary interface -- between the
+library itself.
+(The ((ABI)) -- ((application binary interface)) -- between the
 library and the application is controlled in a similar, but different
 manner depending upon the link options and how the library is built.)
 
 == RETURN VALUES
 
-C string (NUL-terminated) containing the library version number.
+C string (`NUL`-terminated) containing the library version number.
 
 == ERRORS
 
-- 
cgit v1.2.3-70-g09d2

