From 51bebe0c6f137d293dbb6f1194ad3f6fca5b79e9 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 6 Feb 2018 16:07:10 -0800
Subject: Document HTTP server API completely.

---
 docs/nng_aio_set_input.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/nng_aio_set_input.adoc')

diff --git a/docs/nng_aio_set_input.adoc b/docs/nng_aio_set_input.adoc
index 6e0abefe..a6ffa4a7 100644
--- a/docs/nng_aio_set_input.adoc
+++ b/docs/nng_aio_set_input.adoc
@@ -37,7 +37,7 @@ increase in the future.)
 
 NOTE: If the _index_ does not correspond to a defined input for the operation,
 then this function will have no effect.  Note that attempts to set
-parameters with an index greater than three (3) will simply be ignored.
+parameters with an _index_ greater than three (3) will simply be ignored.
 
 CAUTION: It is an error to call this function while the _aio_ is currently
 in use by an active asynchronous operation.
-- 
cgit v1.2.3-70-g09d2

