From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/nng_aio_set_input.adoc | 62 ---------------------------------------------
 1 file changed, 62 deletions(-)
 delete mode 100644 docs/nng_aio_set_input.adoc

(limited to 'docs/nng_aio_set_input.adoc')

diff --git a/docs/nng_aio_set_input.adoc b/docs/nng_aio_set_input.adoc
deleted file mode 100644
index 3a240c6a..00000000
--- a/docs/nng_aio_set_input.adoc
+++ /dev/null
@@ -1,62 +0,0 @@
-= nng_aio_set_input(3)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_aio_set_input - set input parameter
-
-== SYNOPSIS
-
-[source, c]
------------
-#include <nng/nng.h>
-
-void nng_aio_set_input(nng_aio *aio, unsigned int index, void *param);
------------
-
-== DESCRIPTION
-
-The `nng_aio_set_input()` function sets the input parameter at _index_ 
-to _param_ for the asynchronous operation associated with _aio_.
-
-The type and semantics of input parameters are determined by specific
-operations; the caller must supply appropriate inputs for the operation
-to be performed.
-
-The valid values of _index_ range from zero (0) to three (3), as no operation
-currently defined can accept more than four parameters.  (This limit could
-increase in the future.)
-
-NOTE: If the _index_ does not correspond to a defined input for the operation,
-then this function will have no effect.  Note that attempts to set
-parameters with an _index_ greater than three (3) will simply be ignored.
-
-CAUTION: It is an error to call this function while the _aio_ is currently
-in use by an active asynchronous operation.
-
-An input parameter set with this function may be retrieved later with
-the <<nng_aio_get_input#,nng_aio_get_input(3)>> function.
-
-== RETURN VALUES
-
-None.
-
-== ERRORS
-
-None.
-
-== SEE ALSO
-
-<<nng_aio_alloc#,nng_aio_alloc(3)>>,
-<<nng_aio_get_input#,nng_aio_get_input(3)>>,
-<<nng_aio_get_output#,nng_aio_get_output(3)>>,
-<<nng_aio_result#,nng_aio_result(3)>>,
-<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

