From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/nng_aio_set_timeout.adoc | 60 -------------------------------------------
 1 file changed, 60 deletions(-)
 delete mode 100644 docs/nng_aio_set_timeout.adoc

(limited to 'docs/nng_aio_set_timeout.adoc')

diff --git a/docs/nng_aio_set_timeout.adoc b/docs/nng_aio_set_timeout.adoc
deleted file mode 100644
index ff1244d5..00000000
--- a/docs/nng_aio_set_timeout.adoc
+++ /dev/null
@@ -1,60 +0,0 @@
-= nng_aio_set_timeout(3)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_aio_set_timeout - set asynchronous I/O timeout
-
-== SYNOPSIS
-
-[source, c]
------------
-#include <nng/nng.h>
-
-typedef int nng_duration;
-void nng_aio_set_timeout(nng_aio *aio, nng_duration timeout);
------------
-
-== DESCRIPTION
-
-The `nng_aio_set_timeout()` function sets a _timeout_ for the asynchronous
-operation associated with _aio_.  This causes a timer to be started when the operation is actually
-started.  If the timer expires before the operation is completed, then it is
-aborted with an error of `NNG_ETIMEDOUT`.  The _timeout_ is specified as a
-relative number of milliseconds.
-
-If the timeout is `NNG_DURATION_INFINITE`, then no timeout is used.
-If the timeout is `NNG_DURATION_DEFAULT`, then a "default" or socket-specific
-timeout is used.  (This is frequently the same as `NNG_DURATION_INFINITE`.)
-
-TIP: As most operations involve some context switching, it is usually a good
-idea to allow at least a few tens of milliseconds before timing them out --
-a too small timeout might not allow the operation to properly begin before
-giving up!
-
-The value of _timeout_ set for the _aio_ is persistent, so that if the
-handle is reused for multiple operations, they will have the same relative
-timeout.
-
-== RETURN VALUES
-
-None.
-
-== ERRORS
-
-None.
-
-== SEE ALSO
-
-<<nng_aio_alloc#,nng_aio_alloc(3)>>,
-<<nng_aio_cancel#,nng_aio_cancel(3)>>,
-<<nng_aio_result#,nng_aio_result(3)>>,
-<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

