From f5d62f2b434300070048d4f07630afde4a1d760d Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 16 Feb 2018 20:03:11 -0800
Subject: Add dialer documentation.

---
 docs/nng_dialer_close.adoc | 56 ++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 56 insertions(+)
 create mode 100644 docs/nng_dialer_close.adoc

(limited to 'docs/nng_dialer_close.adoc')

diff --git a/docs/nng_dialer_close.adoc b/docs/nng_dialer_close.adoc
new file mode 100644
index 00000000..f4f5d76b
--- /dev/null
+++ b/docs/nng_dialer_close.adoc
@@ -0,0 +1,56 @@
+= nng_dialer_close(3)
+:doctype: manpage
+:manmanual: nng
+:mansource: nng
+:manvolnum: 3
+:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
+            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
+            {blank} + \
+            This document is supplied under the terms of the \
+            https://opensource.org/licenses/MIT[MIT License].
+
+== NAME
+
+nng_listener_close - close listener
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+
+int nng_dialer_close(nng_dialer d);
+-----------
+
+== DESCRIPTION
+
+The `nng_dialer_close()` function closes the listener _d_.
+This also closes any pipe that has been created by the dialer.
+
+Once this function returns, the dialer _d_ and any of its resources
+are deallocated.  Therefore it is an error to attempt to access _d_
+after this function has returned.  (Attempts to do so will result in
+`NNG_ECLOSED` errors.)
+
+Dialers are implicitly closed when the socket they are associated with
+is closed.
+
+== RETURN VALUES
+
+This function returns 0 on success, and non-zero otherwise.
+
+== ERRORS
+
+`NNG_ECLOSED`:: Parameter _d_ does not refer to an open listener.
+
+== SEE ALSO
+
+<<nng_close#,nng_close(3)>>,
+<<nng_dial#,nng_dial(3)>>,
+<<nng_dialer_create#,nng_dialer_create(3)>>
+<<nng_strerror#,nng_strerror(3)>>,
+<<nng#,nng(7)>>
+
+== COPYRIGHT
+
+{copyright}
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

