From b893f8ff1f96dde567fa6a75f4b15bf69e53d6f5 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 2 Feb 2018 16:59:26 -0800
Subject: Document the HTTP connection handling API.

---
 docs/nng_http_conn_close.adoc | 49 +++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 49 insertions(+)
 create mode 100644 docs/nng_http_conn_close.adoc

(limited to 'docs/nng_http_conn_close.adoc')

diff --git a/docs/nng_http_conn_close.adoc b/docs/nng_http_conn_close.adoc
new file mode 100644
index 00000000..885015a6
--- /dev/null
+++ b/docs/nng_http_conn_close.adoc
@@ -0,0 +1,49 @@
+= nng_http_conn_close(3)
+:doctype: manpage
+:manmanual: nng
+:mansource: nng
+:manvolnum: 3
+:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
+            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
+            {blank} + \
+            This document is supplied under the terms of the \
+            https://opensource.org/licenses/MIT[MIT License].
+
+== NAME
+
+nng_http_conn_close - close HTTP connection
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+
+void nng_http_conn_close(nng_http_conn *conn);
+-----------
+
+== DESCRIPTION
+
+The `nng_http_conn_close()` function closes the supplied HTTP connection _conn_,
+including any disposing of any underlying file descriptors or related resources.
+
+Once this function, no further access to the _conn_ structure may be made.
+
+== RETURN VALUES
+
+None.
+
+== ERRORS
+
+None.
+
+== SEE ALSO
+
+<<nng_http_client_connect#,nng_http_client_connect(3)>>,
+<<nng_http_alloc_handler#,nng_http_alloc_handler(3)>>,
+<<nng_strerror#,nng_strerror(3)>>,
+<<nng#,nng(7)>>
+
+== COPYRIGHT
+
+{copyright}
-- 
cgit v1.2.3-70-g09d2

