From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/nng_http_server_set_tls.adoc | 60 ---------------------------------------
 1 file changed, 60 deletions(-)
 delete mode 100644 docs/nng_http_server_set_tls.adoc

(limited to 'docs/nng_http_server_set_tls.adoc')

diff --git a/docs/nng_http_server_set_tls.adoc b/docs/nng_http_server_set_tls.adoc
deleted file mode 100644
index 50039e49..00000000
--- a/docs/nng_http_server_set_tls.adoc
+++ /dev/null
@@ -1,60 +0,0 @@
-= nng_http_server_set_tls(3)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_http_server_set_tls - set HTTP server TLS configuration
-
-== SYNOPSIS
-
-[source, c]
------------
-#include <nng/nng.h>
-#include <nng/supplemental/http/http.h>
-
-int nng_http_server_set_tls(nng_http_server *s, nng_tls_config *cfg);
------------
-
-== DESCRIPTION
-
-The `nng_http_server_set_tls()` sets the TLS configuration of server _s_ to
-_cfg_.
-
-This change overwrites any previous TLS configuration.
-
-WARNING: This also invalidates any previously obtained values from
-<<nng_http_server_get_tls#,nng_http_server_get_tls(3)>>.
-
-If the server is already running (i.e. it has been started with
-<<nng_http_server_start#,nng_http_server_start(3)>>) then this will
-fail with `NNG_EBUSY`.
-
-TIP: Generally, the _cfg_ must have a configured private key, set with
-<<nng_tls_config_own_cert#,nng_tls_config_own_cert(3)>> or similar.
-
-== RETURN VALUES
-
-This function returns 0 on success, and non-zero otherwise.
-
-== ERRORS
-
-`NNG_EBUSY`:: Server instance is running.
-`NNG_ENOMEM`:: Insufficient free memory exists.
-`NNG_ENOTSUP`:: Either HTTP or TLS not supported.
-
-== SEE ALSO
-
-<<nng_http_server_get_tls#,nng_http_server_get_tls(3)>>,
-<<nng_http_server_hold#,nng_http_server_hold(3)>>,
-<<nng_http_server_start#,nng_http_server_start(3)>>,
-<<nng_tls_config_alloc#,nng_tls_config_alloc(3)>>,
-<<nng_strerror#,nng_strerror(3)>>,
-<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

