From 51bebe0c6f137d293dbb6f1194ad3f6fca5b79e9 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 6 Feb 2018 16:07:10 -0800
Subject: Document HTTP server API completely.

---
 docs/nng_http_server_stop.adoc | 48 ++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 48 insertions(+)
 create mode 100644 docs/nng_http_server_stop.adoc

(limited to 'docs/nng_http_server_stop.adoc')

diff --git a/docs/nng_http_server_stop.adoc b/docs/nng_http_server_stop.adoc
new file mode 100644
index 00000000..f2577b2e
--- /dev/null
+++ b/docs/nng_http_server_stop.adoc
@@ -0,0 +1,48 @@
+= nng_http_server_stop(3)
+:doctype: manpage
+:manmanual: nng
+:mansource: nng
+:manvolnum: 3
+:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
+            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
+            {blank} + \
+            This document is supplied under the terms of the \
+            https://opensource.org/licenses/MIT[MIT License].
+
+== NAME
+
+nng_http_server_stop - stop HTTP server
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+
+void nng_http_server_stop(nng_http_server *server);
+-----------
+
+
+== DESCRIPTION
+
+The `nng_http_server_stop()` stops the HTTP server instance _server_.
+This will cause it to close any underlying TCP sockets, and to terminate
+any HTTP connections associated with it.
+
+== RETURN VALUES
+
+None.
+
+== ERRORS
+
+None.
+
+== SEE ALSO
+
+<<nng_http_server_hold#,nng_http_server_hold(3)>>,
+<<nng_http_server_start#,nng_http_server_start(3)>>,
+<<nng#,nng(7)>>
+
+== COPYRIGHT
+
+{copyright}
-- 
cgit v1.2.3-70-g09d2

