From edced7d757bc3bfb98961e0d78695e4bedbb4561 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 22 Jan 2018 20:38:20 -0800
Subject: fixes #221 zerotier URL format changes

We are adopting a more standard URL format for zerotier, and making
more use of the URL parsing common layer.  While here we updated
the docs to reflect correctly the URI syntax we are using everywhere.
---
 docs/nng_ipc.adoc | 9 ++-------
 1 file changed, 2 insertions(+), 7 deletions(-)

(limited to 'docs/nng_ipc.adoc')

diff --git a/docs/nng_ipc.adoc b/docs/nng_ipc.adoc
index 6367a681..c1fcd5c4 100644
--- a/docs/nng_ipc.adoc
+++ b/docs/nng_ipc.adoc
@@ -47,17 +47,12 @@ URI Format
 ~~~~~~~~~~
 
 This transport uses URIs using the scheme `ipc://`, followed by
-a path name in the file system where the socket or named pipe
+a an absolute path name in the file system where the socket or named pipe
 should be created.
 
 TIP: On Windows, all names are prefixed by `\.\pipe\` and do not
 occupy the normal file system.  On POSIX platforms, the path is
-taken literally, and is relative to the current directory, unless
-an extra leading `/` is provided.  For example, `ipc://myname` refers
-to the name `myname` in the current directory, whereas `ipc:///tmp/myname`
-refers to `myname` located in `/tmp`.
-
-The entire URI must be less than `NNG_MAXADDRLEN` bytes long.
+taken literally, and is relative to the root directory.
 
 Socket Address
 ~~~~~~~~~~~~~~
-- 
cgit v1.2.3-70-g09d2

