From 6dddc0bfcb79615b8be470a5e16918360d57cadb Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 9 Jan 2018 18:42:28 -0800
Subject: fixes #186 Suggested API changes for nng TLS certs

---
 docs/nng_tls_config_cert.adoc | 86 -------------------------------------------
 1 file changed, 86 deletions(-)
 delete mode 100644 docs/nng_tls_config_cert.adoc

(limited to 'docs/nng_tls_config_cert.adoc')

diff --git a/docs/nng_tls_config_cert.adoc b/docs/nng_tls_config_cert.adoc
deleted file mode 100644
index f0ae7351..00000000
--- a/docs/nng_tls_config_cert.adoc
+++ /dev/null
@@ -1,86 +0,0 @@
-nng_tls_config_cert(3)
-======================
-:doctype: manpage
-:manmanual: nng
-:mansource: nng
-:manvolnum: 3
-:icons: font
-:source-highlighter: pygments
-:copyright: Copyright 2018 Staysail Systems, Inc. <info@staysail.tech> \
-            Copyright 2018 Capitar IT Group BV <info@capitar.com> \
-            This software is supplied under the terms of the MIT License, a \
-            copy of which should be located in the distribution where this \
-            file was obtained (LICENSE.txt).  A copy of the license may also \
-            be found online at https://opensource.org/licenses/MIT.
-
-NAME
-----
-nng_tls_config_cert - configure own certificate
-
-SYNOPSIS
---------
-
-[source, c]
------------
-#include <nng/nng.h>
-
-int nng_tls_config_cert(nni_tls_config *cfg, const uint8_t *cert, size_t size)
------------
-
-DESCRIPTION
------------
-
-The `nng_tls_config_cert()` function configures a certificate identifying
-the local side of a TLS connection used with 'cfg'.  The certificate may be
-a chain, with the bottom-most signer first and the root at the end.  The
-self-signed certificate at the end can be omitted. (The client should already
-have it, and will have to in order to validate this certificate anyway).
-
-NOTE: The certificate supplied always contains public keying material.  In
-order to actually use this, a private key will have to be supplied as well,
-using the <<nng_tls_config_key#,nnt_tls_config_key(3)>> function.
-
-TIP: This function may be called multiple times, to add additional chains
-to a configuration, without affecting those added previously.
-
-The certificate located in 'cert' may be in either
-https://tools.ietf.org/html/rfc7468[PEM] or DER format.
-
-When the 'cert' is
-in PEM format, the certificate will be ASCII encoded.  Additionally a private
-key may or may not be present as additional concatenated PEM data.  The
-value of 'size' is the length of the concatenated strings, without any
-terminating NUL byte.
-
-When using DER encoding, the 'size' will be the total number of bytes, after
-encoding.
-
-RETURN VALUES
--------------
-
-This function returns 0 on success, and non-zero otherwise.
-
-ERRORS
-------
-
-`NNG_ENOMEM`:: Insufficient memory is available.
-`NNG_EBUSY`:: The configuration 'cfg' is already in use, and cannot be modified.
-`NNG_EINVAL`:: An invalid 'cert' or 'size' was supplied.
-
-SEE ALSO
---------
-
-<<nng_strerror#,nng_strerror(3)>>,
-<<nng_tls_config_alloc#,nng_tls_config_alloc(3)>>,
-<<nng_tls_config_key#,nng_tls_config_key(3)>>,
-<<nng#,nng(7)>>
-
-
-COPYRIGHT
----------
-
-Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] +
-Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV]
-
-This document is supplied under the terms of the
-https://opensource.org/licenses/MIT[MIT License].
-- 
cgit v1.2.3-70-g09d2

