From 6dddc0bfcb79615b8be470a5e16918360d57cadb Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 9 Jan 2018 18:42:28 -0800
Subject: fixes #186 Suggested API changes for nng TLS certs

---
 docs/nng_tls_config_key.adoc | 82 --------------------------------------------
 1 file changed, 82 deletions(-)
 delete mode 100644 docs/nng_tls_config_key.adoc

(limited to 'docs/nng_tls_config_key.adoc')

diff --git a/docs/nng_tls_config_key.adoc b/docs/nng_tls_config_key.adoc
deleted file mode 100644
index 69e33fea..00000000
--- a/docs/nng_tls_config_key.adoc
+++ /dev/null
@@ -1,82 +0,0 @@
-nng_tls_config_key(3)
-=====================
-:doctype: manpage
-:manmanual: nng
-:mansource: nng
-:manvolnum: 3
-:icons: font
-:source-highlighter: pygments
-:copyright: Copyright 2018 Staysail Systems, Inc. <info@staysail.tech> \
-            Copyright 2018 Capitar IT Group BV <info@capitar.com> \
-            This software is supplied under the terms of the MIT License, a \
-            copy of which should be located in the distribution where this \
-            file was obtained (LICENSE.txt).  A copy of the license may also \
-            be found online at https://opensource.org/licenses/MIT.
-
-NAME
-----
-nng_tls_config_key - configure certificate authority certificate chain
-
-SYNOPSIS
---------
-
-[source, c]
------------
-#include <nng/nng.h>
-
-int nng_tls_config_key(nni_tls_config *cfg, const uint8_t *key, size_t size)
------------
-
-DESCRIPTION
------------
-
-The `nng_tls_config_key()` function configures a private  'key' to be used
-along with a certificate established with
-<<nng_tls_config_cert#,nng_tls_config_cert(3)>>, for the given configuration
-'cfg'.
-
-This function should be called immediately after `nng_tls_config_cert()`,
-with the appropriate private key.
-
-The 'key' may be in either https://tools.ietf.org/html/rfc7468[PEM] or DER
-format.  When the 'chain' is
-in PEM format, the key will be ASCII encoded. A certificate may be present
-as well.  The value of 'size' corresponds to the PEM encoding, not including
-any terminating NUL byte.
-
-When using DER encoding, the 'size' will be the total number of bytes, after
-encoding.
-
-The key material may be encrypted with a password, which can be supplied
-using the <<nng_tls_config_pass#,nng_tls_config_pass(3)>> function.
-
-RETURN VALUES
--------------
-
-This function returns 0 on success, and non-zero otherwise.
-
-ERRORS
-------
-
-`NNG_ENOMEM`:: Insufficient memory is available.
-`NNG_EBUSY`:: The configuration 'cfg' is already in use, and cannot be modified.
-`NNG_EINVAL`:: An invalid 'key' or 'size' was supplied.
-
-SEE ALSO
---------
-
-<<nng_strerror#,nng_strerror(3)>>,
-<<nng_tls_config_alloc#,nng_tls_config_alloc(3)>>,
-<<nng_tls_config_cert#,nng_tls_config_cert(3)>>,
-<<nng_tls_config_pass#,nng_tls_config_pass(3)>>,
-<<nng#,nng(7)>>
-
-
-COPYRIGHT
----------
-
-Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] +
-Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV]
-
-This document is supplied under the terms of the
-https://opensource.org/licenses/MIT[MIT License].
-- 
cgit v1.2.3-70-g09d2

