From 6dddc0bfcb79615b8be470a5e16918360d57cadb Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 9 Jan 2018 18:42:28 -0800
Subject: fixes #186 Suggested API changes for nng TLS certs

---
 docs/nng_tls_config_pass.adoc | 70 -------------------------------------------
 1 file changed, 70 deletions(-)
 delete mode 100644 docs/nng_tls_config_pass.adoc

(limited to 'docs/nng_tls_config_pass.adoc')

diff --git a/docs/nng_tls_config_pass.adoc b/docs/nng_tls_config_pass.adoc
deleted file mode 100644
index ca6a17e2..00000000
--- a/docs/nng_tls_config_pass.adoc
+++ /dev/null
@@ -1,70 +0,0 @@
-nng_tls_config_pass(3)
-======================
-:doctype: manpage
-:manmanual: nng
-:mansource: nng
-:manvolnum: 3
-:icons: font
-:source-highlighter: pygments
-:copyright: Copyright 2018 Staysail Systems, Inc. <info@staysail.tech> \
-            Copyright 2018 Capitar IT Group BV <info@capitar.com> \
-            This software is supplied under the terms of the MIT License, a \
-            copy of which should be located in the distribution where this \
-            file was obtained (LICENSE.txt).  A copy of the license may also \
-            be found online at https://opensource.org/licenses/MIT.
-
-NAME
-----
-nng_tls_config_pass - configure private key password
-
-SYNOPSIS
---------
-
-[source, c]
------------
-#include <nng/nng.h>
-
-int nng_tls_config_pass(nni_tls_config *cfg, const char *password)
------------
-
-DESCRIPTION
------------
-
-The `nng_tls_config_pass()` function configures 'password' used to decrypt
-a private key previously configured on the configuration 'cfg' with
-<<nng_tls_config_key#,nng_tls_config_key(3)>>.
-
-The 'password' is an ASCIIZ string.
-
-This function's affect is limited to decryption only the most recent
-private key that was configured.
-
-RETURN VALUES
--------------
-
-This function returns 0 on success, and non-zero otherwise.
-
-ERRORS
-------
-
-`NNG_ENOMEM`:: Insufficient memory is available.
-`NNG_EBUSY`:: The configuration 'cfg' is already in use, and cannot be modified.
-`NNG_EINVAL`:: No private key was configured.
-
-SEE ALSO
---------
-
-<<nng_strerror#,nng_strerror(3)>>,
-<<nng_tls_config_alloc#,nng_tls_config_alloc(3)>>,
-<<nng_tls_config_key#,nng_tls_config_key(3)>>,
-<<nng#,nng(7)>>
-
-
-COPYRIGHT
----------
-
-Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] +
-Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV]
-
-This document is supplied under the terms of the
-https://opensource.org/licenses/MIT[MIT License].
-- 
cgit v1.2.3-70-g09d2

