From 05beb9ed7d75142483e3963501898fd9f32d7508 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 5 Apr 2024 00:36:24 -0700
Subject: Added nng_strerror and nng_msleep.

---
 docs/ref/util/nng_msleep.adoc | 22 ++++++++++++++++++++++
 1 file changed, 22 insertions(+)
 create mode 100644 docs/ref/util/nng_msleep.adoc

(limited to 'docs/ref/util/nng_msleep.adoc')

diff --git a/docs/ref/util/nng_msleep.adoc b/docs/ref/util/nng_msleep.adoc
new file mode 100644
index 00000000..83e69c60
--- /dev/null
+++ b/docs/ref/util/nng_msleep.adoc
@@ -0,0 +1,22 @@
+## nng_msleep
+
+Sleep milliseconds.
+
+### Synopsis
+
+```c
+#include <nng/nng.h>
+#include <nng/supplemental/util/platform.h>
+
+void nng_msleep(nng_duration msec);
+```
+
+### Description
+
+The `nng_msleep` blocks the caller for at least _msec_ milliseconds.footnote:[This function may block for longer than requested.
+The actual wait time is determined by the timer resolution of the underlying system.]
+
+### See Also
+
+xref:../aio/nng_sleep_aio.adoc[nng_sleep_aio],
+xref:nng_clock.adoc[nng_clock]
-- 
cgit v1.2.3-70-g09d2

