From 15ba8bafbcba368884598fd2fdff627630626a1f Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 24 Dec 2019 01:18:11 -0800
Subject: Note that we are moving away from C-Convey.

---
 tests/README.adoc | 9 +++++----
 1 file changed, 5 insertions(+), 4 deletions(-)

(limited to 'tests/README.adoc')

diff --git a/tests/README.adoc b/tests/README.adoc
index d9cd71fd..fe702efc 100644
--- a/tests/README.adoc
+++ b/tests/README.adoc
@@ -1,5 +1,4 @@
-About C-Convey
---------------
+== About C-Convey
 
 The convey framework in this directory was originally started for
 this project, but has since been promoted to a project of it's own.
@@ -9,5 +8,7 @@ for updates and further information.
 The convey framework is licensed under the same terms as the rest
 of this project (MIT style license).
 
-If updating the code here, please also work with the upstream to
-ensure that appropriate changes or fixes are made upstream.
+Having said that, we are moving towards a new testing infrastructure.
+See the acutest.h header in this directory, along with testutil.h.
+
+Please do not write new tests in c-convey format.
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

