= nng_aio_reset(3)
//
// Copyright 2024 Staysail Systems, Inc. <info@staysail.tech>
//
// This document is supplied under the terms of the MIT License, a
// copy of which should be located in the distribution where this
// file was obtained (LICENSE.txt).  A copy of the license may also be
// found online at https://opensource.org/licenses/MIT.
//

== NAME

nng_aio_reset - reset asynchronous I/O operation

== SYNOPSIS

[source, c]
----
#include <nng/nng.h>

void nng_aio_reset(nng_aio *aio);
----

== DESCRIPTION

The `nng_aio_reset()` is used by providers to reset certain fields in the _aio_.
This should be done before performing any operations on _aio_.

NOTE: This function is only for I/O providers (those actually performing
the operation such as HTTP handler functions or transport providers); ordinary
users of the _aio_ should not call this function.

== SEE ALSO

[.text-left]
xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
xref:nng_aio_cancel.3.adoc[nng_aio_cancel(3)],
xref:nng_aio_start.3.adoc[nng_aio_start(3)],
xref:nng_aio_finish.3.adoc[nng_aio_finish(3)],
xref:nng_aio_result.3.adoc[nng_aio_result(3)],
xref:nng_aio.5.adoc[nng_aio(5)],
xref:nng.7.adoc[nng(7)]
