= nng_http_server_stop(3http)
//
// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
// Copyright 2018 Capitar IT Group BV <info@capitar.com>
//
// This document is supplied under the terms of the MIT License, a
// copy of which should be located in the distribution where this
// file was obtained (LICENSE.txt).  A copy of the license may also be
// found online at https://opensource.org/licenses/MIT.
//

== NAME

nng_http_server_stop - stop HTTP server

== SYNOPSIS

[source, c]
-----------
#include <nng/nng.h>
#include <nng/supplemental/http/http.h>

void nng_http_server_stop(nng_http_server *server);
-----------

== DESCRIPTION

The `nng_http_server_stop()` stops the HTTP server instance _server_.
This will cause it to close any underlying TCP sockets, and to terminate
any HTTP connections associated with it.

== RETURN VALUES

None.

== ERRORS

None.

== SEE ALSO

<<nng_http_server_hold.3http#,nng_http_server_hold(3http)>>,
<<nng_http_server_start.3http#,nng_http_server_start(3http)>>,
<<nng.7#,nng(7)>>
