= nng_http_conn_close(3)
:doctype: manpage
:manmanual: nng
:mansource: nng
:manvolnum: 3
:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
            {blank} + \
            This document is supplied under the terms of the \
            https://opensource.org/licenses/MIT[MIT License].

== NAME

nng_http_conn_close - close HTTP connection

== SYNOPSIS

[source, c]
-----------
#include <nng/nng.h>

void nng_http_conn_close(nng_http_conn *conn);
-----------

== DESCRIPTION

The `nng_http_conn_close()` function closes the supplied HTTP connection _conn_,
including any disposing of any underlying file descriptors or related resources.

Once this function, no further access to the _conn_ structure may be made.

== RETURN VALUES

None.

== ERRORS

None.

== SEE ALSO

<<nng_http_client_connect#,nng_http_client_connect(3)>>,
<<nng_http_alloc_handler#,nng_http_alloc_handler(3)>>,
<<nng_strerror#,nng_strerror(3)>>,
<<nng#,nng(7)>>

== COPYRIGHT

{copyright}
