= nng_http_handler_free(3)
:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
            {blank} + \
            This document is supplied under the terms of the \
            https://opensource.org/licenses/MIT[MIT License].

== NAME

nng_http_handler_free - free HTTP server handler

== SYNOPSIS

[source, c]
-----------
#include <nng/nng.h>
#include <nng/supplemental/http/http.h>

void nng_http_handler_free(nng_http_handler *h);
-----------


== DESCRIPTION

The `nng_http_handler_free()` function frees an allocated HTTP server handler.

CAUTION: It is an error to free a handler that is registered with a server.
Any handlers that are registered with servers are automatically freed
when the server itself is deallocated.

== RETURN VALUES

None.

== ERRORS

None.

== SEE ALSO

<<nng_http_handler_alloc#,nng_http_handler_alloc(3)>>,
<<nng_http_server_add_handler#,nng_http_server_add_handler(3)>>,
<<nng#,nng(7)>>

== COPYRIGHT

{copyright}
