= nng_http_server_stop(3)
:copyright: Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] + \
            Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV] + \
            {blank} + \
            This document is supplied under the terms of the \
            https://opensource.org/licenses/MIT[MIT License].

== NAME

nng_http_server_stop - stop HTTP server

== SYNOPSIS

[source, c]
-----------
#include <nng/nng.h>
#include <nng/supplemental/http/http.h>

void nng_http_server_stop(nng_http_server *server);
-----------


== DESCRIPTION

The `nng_http_server_stop()` stops the HTTP server instance _server_.
This will cause it to close any underlying TCP sockets, and to terminate
any HTTP connections associated with it.

== RETURN VALUES

None.

== ERRORS

None.

== SEE ALSO

<<nng_http_server_hold#,nng_http_server_hold(3)>>,
<<nng_http_server_start#,nng_http_server_start(3)>>,
<<nng#,nng(7)>>

== COPYRIGHT

{copyright}
