nng_tls_config_alloc(3)
=======================
:doctype: manpage
:manmanual: nng
:mansource: nng
:manvolnum: 3
:icons: font
:source-highlighter: pygments
:copyright: Copyright 2018 Staysail Systems, Inc. <info@staysail.tech> \
            Copyright 2018 Capitar IT Group BV <info@capitar.com> \
            This software is supplied under the terms of the MIT License, a \
            copy of which should be located in the distribution where this \
            file was obtained (LICENSE.txt).  A copy of the license may also \
            be found online at https://opensource.org/licenses/MIT.

NAME
----
nng_tls_config_free - deallocate a TLS configuration object

SYNOPSIS
--------

[source, c]
-----------
#include <nng/nng.h>

void nng_tls_config_free(nni_tls_config *cfg);
-----------

DESCRIPTION
-----------

The `nng_tls_config_free()` decrements the reference count on the
TLS configuration object pointed to by 'cfg', and if the resulting
reference count is zero, then deallocates the configuration object.

RETURN VALUES
-------------

None.


ERRORS
------

None.


SEE ALSO
--------

<<nng_tls_config_alloc#,nng_tls_config_alloc(3)>>,
<<nng#,nng(7)>>


COPYRIGHT
---------

Copyright 2018 mailto:info@staysail.tech[Staysail Systems, Inc.] +
Copyright 2018 mailto:info@capitar.com[Capitar IT Group BV]

This document is supplied under the terms of the
https://opensource.org/licenses/MIT[MIT License].
