## nn_get_statistic

Get statistic (stub).

### Synopsis

```c
#include <nanomsg/nn.h>

uint64_t nn_get_statistic(int sock, int stat);
```

### Description

The `nn_get_statistic` function exists only as a stub, and always returns zero.

### Return Values

Zero.
